NAME

fd2 - redirect from/to file descriptor 2

SYNOPSIS

fd2 [-e] [-f file] [--] command[arg ...]

DESCRIPTION

Since the Version 6 (V6) UNIX shell provides no way to redirect the diagnostic output, fd2 makes this possible by executing the specified commandwith the given arguments and redirecting file descriptor 2 (standard error) to file descriptor 1 (standard output) by default.

The options are as follows:

-e Causes all conventional output from commandto be redirected to the standard error as diagnostic output.

-f file

Causes all diagnostic output from commandto be redirected to file, which is created if it does not exist. If it already exists, all diagnostic output is appended to the end of file.

-- Causes fd2 to stop further option processing, forcing it to treat all following arguments as command[arg ...] .

EXIT STATUS

If fd2 detects an error, it prints an appropriate diagnostic and exits with a non-zero status. Otherwise, the exit status is that of the executed command.

ENVIRONMENT

EXECSHELL

If set to a non-empty string, the value of this variable is taken as the path name of the shell which is invoked to execute the specified command when it does not begin with the proper magic number or a ‘#!shell’ sequence.

PATH

If set to a non-empty string, the value of this variable is taken as the sequence of directories which is used to search for the specified command.

EXAMPLES

The examples below which refer to ‘/tmp/$$’ assume that this directory exists and is writable by the user. The following command line:

FD2(1) General Commands Manual FD2(1)

etsh-5.4.0 March 28, 2019 FD2(1) fd2 -e echo progname: Error message causes all conventional output from echo to be redirected to the standard error as diagnostic output. The following command line:

fd2 make foo >/tmp/$$/foo.outerr causes all conventional and diagnostic output from maketo be redirected to the file ‘/tmp/$$/foo.outerr’, which is first created by the shell. In contrast:

fd2 -f /tmp/$$/foo.err make foo >/tmp/$$/foo.out causes all conventional output to be redirected to the file ‘/tmp/$$/foo.out’, which is created by the shell. All diagnostic output is redirected to the file ‘/tmp/$$/foo.err’, which is created by fd2 if it does not already exist.

SEE ALSO

etsh(1), tsh(1) Etsh home page: https://etsh.nl/ AUTHOR

Jeffrey Allen Neitzel <jan@etsh.nl> wrote this implementation of the fd2 command and maintains it as fd2(1).

LICENSE

See either the LICENSE file which is distributed with etsh or https://etsh.nl/license/ for full details.

FD2(1) General Commands Manual FD2(1)

etsh-5.4.0 March 28, 2019 FD2(1)